From 348cf1a55c8ed2442d58ec29034966ba1d05980e Mon Sep 17 00:00:00 2001
From: Steve Bennett <steveb@workware.net.au>
Date: Tue, 26 Nov 2013 08:48:14 +1000
Subject: aio: add support for half-close

Currently only for sockets since Jim Tcl does not support
bidirectional pipes.

Signed-off-by: Steve Bennett <steveb@workware.net.au>
---
 auto.def | 1 +
 1 file changed, 1 insertion(+)

(limited to 'auto.def')

diff --git a/auto.def b/auto.def
index 556361a..59baea0 100644
--- a/auto.def
+++ b/auto.def
@@ -87,6 +87,7 @@ cc-check-functions ualarm lstat fork vfork system select execvpe
 cc-check-functions backtrace geteuid mkstemp realpath strptime isatty
 cc-check-functions regcomp waitpid sigaction sys_signame sys_siglist isascii
 cc-check-functions syslog opendir readlink sleep usleep pipe getaddrinfo utimes
+cc-check-functions shutdown
 if {[cc-check-functions sysinfo]} {
     cc-with {-includes sys/sysinfo.h} {
         cc-check-members "struct sysinfo.uptime"
-- 
cgit v1.1

