From e674a695bb1521a04d1a1f721c4c7e2f4a9ebba9 Mon Sep 17 00:00:00 2001
From: Bill Traynor <wmat@riscv.org>
Date: Mon, 15 May 2023 11:43:32 -0400
Subject: Replacing latexmath with html code.

Replaced latexmath for greater than or equal to with &#8805; html
---
 src/supervisor.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/supervisor.adoc')

diff --git a/src/supervisor.adoc b/src/supervisor.adoc
index a069e3c..ace19a4 100644
--- a/src/supervisor.adoc
+++ b/src/supervisor.adoc
@@ -198,7 +198,7 @@ field.
 |Value |Name |Description
 |0 +
 1 +
-latexmath:[$\ge$]2 
+&#8805;2 
 |Direct +
 Vectored
 |All exceptions set `pc` to BASE. +
-- 
cgit v1.1

