From 8176af1a46bfe2e15f8cdb170d74e52e1ba6efa2 Mon Sep 17 00:00:00 2001
From: Andrew Waterman <andrew@sifive.com>
Date: Sat, 16 Sep 2023 19:50:44 -0700
Subject: Standardize on no hyphen in illegal instruction exception (#1131)

---
 src/supervisor.adoc | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'src/supervisor.adoc')

diff --git a/src/supervisor.adoc b/src/supervisor.adoc
index f3771ef..8e66a26 100644
--- a/src/supervisor.adoc
+++ b/src/supervisor.adoc
@@ -538,14 +538,14 @@ address of the portion of the instruction that caused the fault, while
 The `stval` register can optionally also be used to return the faulting
 instruction bits on an illegal instruction exception (`sepc` points to
 the faulting instruction in memory). If `stval` is written with a
-nonzero value when an illegal-instruction exception occurs, then `stval`
+nonzero value when an illegal instruction exception occurs, then `stval`
 will contain the shortest of:
 
 * the actual faulting instruction
 * the first ILEN bits of the faulting instruction
 * the first SXLEN bits of the faulting instruction
 
-The value loaded into `stval` on an illegal-instruction exception is
+The value loaded into `stval` on an illegal instruction exception is
 right-justified and all unused upper bits are cleared to zero.
 
 For other traps, `stval` is set to zero, but a future standard may
-- 
cgit v1.1

