From f94f62b4ff2aaa9d572bdd9c361455f05a1c655b Mon Sep 17 00:00:00 2001
From: Bill Traynor <wmat@riscv.org>
Date: Wed, 18 Jan 2023 13:11:47 -0500
Subject: Updating Table 46 label.

Updating Table 46 label to correct for the fri-rfi
litmus test.
---
 src/mm-eplan.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/mm-eplan.adoc')

diff --git a/src/mm-eplan.adoc b/src/mm-eplan.adoc
index 70ed211..394fe29 100644
--- a/src/mm-eplan.adoc
+++ b/src/mm-eplan.adoc
@@ -497,7 +497,7 @@ requirements in terms of the global memory order requires a bit of
 indirection.
 
 [[frirfi]]
-.A sample litmus test and one forbidden execution (a0=1)
+.A litmus test MP+fence.w.w+fri-rfi-addr (outcome permitted)
 
 [float="center",align="center",cols=".^1a,.^1a",frame="none",grid="none",options="noheader"]
 |===
-- 
cgit v1.1

