From d125ebd61769cefce9f4327aa839a65018a84975 Mon Sep 17 00:00:00 2001
From: wmat <wmat@riscv.org>
Date: Tue, 9 Apr 2024 15:34:25 -0400
Subject: Updating chapter titles to make them consisten.

Removed extraneous use of the word Standard.
Quoted extension names when applicable.
---
 src/f-st-ext.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/f-st-ext.adoc')

diff --git a/src/f-st-ext.adoc b/src/f-st-ext.adoc
index 24941ed..96d5b44 100644
--- a/src/f-st-ext.adoc
+++ b/src/f-st-ext.adoc
@@ -1,7 +1,7 @@
 :stem: latexmath
 
 [[single-float]]
-== "F" Standard Extension for Single-Precision Floating-Point, Version 2.2
+== "F" Extension for Single-Precision Floating-Point, Version 2.2
 
 This chapter describes the standard instruction-set extension for
 single-precision floating-point, which is named "F" and adds
-- 
cgit v1.1

