From a4954af2fd406e6f7fb9a1925d5b870c6bb155ec Mon Sep 17 00:00:00 2001
From: elisa <elisa@riscv.org>
Date: Wed, 20 Oct 2021 12:00:49 -0700
Subject: table and diagram fixes

---
 src/counters.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/counters.adoc')

diff --git a/src/counters.adoc b/src/counters.adoc
index a92b3fc..38f7ac3 100644
--- a/src/counters.adoc
+++ b/src/counters.adoc
@@ -46,7 +46,7 @@ environment should provide a means to determine the current rate
 [TIP]
 ====
 RDCYCLE is intended to return the number of cycles executed by the
-processor core, not the hart. Precisely defining what is a "core"
+processor core, not the hart. Precisely defining what is a "core" is
 difficult given some implementation choices (e.g., AMD Bulldozer).
 Precisely defining what is a "clock cycle" is also difficult given the
 range of implementations (including software emulations), but the intent
-- 
cgit v1.1

