<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">(* Library module defined by the International Standard
   Information technology - programming languages
   BS ISO/IEC 10514-1:1996E Part 1: Modula-2, Base Language.

   Copyright ISO/IEC (International Organization for Standardization
   and International Electrotechnical Commission) 1996-2021.

   It may be freely copied for the purpose of implementation (see page
   707 of the Information technology - Programming languages Part 1:
   Modula-2, Base Language.  BS ISO/IEC 10514-1:1996).  *)

DEFINITION MODULE ProgramArgs;
 
  (* Access to program arguments *)
 
IMPORT IOChan;
 
TYPE
  ChanId = IOChan.ChanId;
 
PROCEDURE ArgChan (): ChanId;
  (* Returns a value that identifies a channel for reading
     program arguments *)
 
PROCEDURE IsArgPresent (): BOOLEAN;
  (* Tests if there is a current argument to read from.  If not,
     read &lt;= IOChan.CurrentFlags() will be FALSE, and attempting
     to read from the argument channel will raise the exception
     notAvailable.
  *)
 
PROCEDURE NextArg ();
  (* If there is another argument, causes subsequent input from the
     argument device to come from the start of the next argument.
     Otherwise there is no argument to read from, and a call of
     IsArgPresent will return FALSE.
  *)
 
END ProgramArgs.
</pre></body></html>