(* M2DebugStack.def display parameter stack.

Copyright (C) 2011-2024 Free Software Foundation, Inc.
Contributed by Gaius Mulley <gaius.mulley@southwales.ac.uk>.

This file is part of GNU Modula-2.

GNU Modula-2 is free software; you can redistribute it and/or modify
it under the terms of the GNU General Public License as published by
the Free Software Foundation; either version 3, or (at your option)
any later version.

GNU Modula-2 is distributed in the hope that it will be useful, but
WITHOUT ANY WARRANTY; without even the implied warranty of
MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the GNU
General Public License for more details.

You should have received a copy of the GNU General Public License
along with GNU Modula-2; see the file COPYING3.  If not see
<http://www.gnu.org/licenses/>.  *)

DEFINITION MODULE M2DebugStack ;

(*
    Title      : M2DebugStack
    Author     : Gaius Mulley
    System     : GNU Modula-2
    Date       : Mon Dec  5 16:19:43 2011
    Revision   : $Version$
    Description: provides a procedure which displays the
                 compile time stack neatly and with annotation.
*)

FROM SYSTEM IMPORT WORD ;
FROM DynamicStrings IMPORT String ;

TYPE
   ProcedureWord    = PROCEDURE (CARDINAL) : WORD ;
   ProcedureString  = PROCEDURE (CARDINAL) : String ;


(*
   DebugStack - displays the stack.
*)

PROCEDURE DebugStack (amount: CARDINAL;
                      opt, opf, opa, opd, oprw, optk: ProcedureWord;
                      opanno: ProcedureString) ;


END M2DebugStack.
