(* M2AsmUtil.def provides asm symbol name conversion.

Copyright (C) 2001-2024 Free Software Foundation, Inc.
Contributed by Gaius Mulley <gaius.mulley@southwales.ac.uk>.

This file is part of GNU Modula-2.

GNU Modula-2 is free software; you can redistribute it and/or modify
it under the terms of the GNU General Public License as published by
the Free Software Foundation; either version 3, or (at your option)
any later version.

GNU Modula-2 is distributed in the hope that it will be useful, but
WITHOUT ANY WARRANTY; without even the implied warranty of
MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the GNU
General Public License for more details.

You should have received a copy of the GNU General Public License
along with GNU Modula-2; see the file COPYING3.  If not see
<http://www.gnu.org/licenses/>.  *)

DEFINITION MODULE M2AsmUtil ;

(*
   Author     : Gaius Mulley
   Title      : M2AsmUtil
   Date       : Thu Feb  1 15:34:08 GMT 1990
   Description: Provides utilities relating symbols in the SymbolTable
                to their equivalent representation in ASM format.
*)

FROM DynamicStrings IMPORT String ;
FROM NameKey IMPORT Name ;
EXPORT QUALIFIED GetFullSymName, GetFullScopeAsmName ;


(*
   GetFullSymName - returns the NameKey for the symbol name (which also
                    may contain the module name). This is the same as
                    GetAsmName except that it does not have the leading _
*)

PROCEDURE GetFullSymName (sym: CARDINAL) : Name ;


(*
   GetFullScopeAsmName - returns the fully qualified name for the symbol.
                         This will take the format
                         [DefImpModule|Module]_{InnerModule}_{Procedure}_SymbolName
*)

PROCEDURE GetFullScopeAsmName (sym: CARDINAL) : Name ;


END M2AsmUtil.
