/* Definitions of target machine for GNU compiler, for IBM RS/6000.
   Copyright (C) 2002, 2003 Free Software Foundation, Inc.
   Contributed by Richard Kenner (kenner@vlsi1.ultra.nyu.edu)

   This file is part of GCC.

   GCC is free software; you can redistribute it and/or modify it
   under the terms of the GNU General Public License as published
   by the Free Software Foundation; either version 2, or (at your
   option) any later version.

   GCC is distributed in the hope that it will be useful, but WITHOUT
   ANY WARRANTY; without even the implied warranty of MERCHANTABILITY
   or FITNESS FOR A PARTICULAR PURPOSE.  See the GNU General Public
   License for more details.

   You should have received a copy of the GNU General Public License
   along with GCC; see the file COPYING.  If not, write to the
   Free Software Foundation, 59 Temple Place - Suite 330, Boston,
   MA 02111-1307, USA.  */

/* Add any extra modes needed to represent the condition code.

   For the RS/6000, we need separate modes when unsigned (logical) comparisons
   are being done and we need a separate mode for floating-point.  We also
   use a mode for the case when we are comparing the results of two
   comparisons, as then only the EQ bit is valid in the register.  */

CC (CCUNS)
CC (CCFP)
CC (CCEQ)
