/* Definitions of target machine for GNU compiler, Adapteva Epiphany cpu.
   Copyright (C) 2002, 2007, 2009, 2011 Free Software Foundation, Inc.
   Contributed by Embecosm on behalf of Adapteva, Inc.

This file is part of GCC.

GCC is free software; you can redistribute it and/or modify
it under the terms of the GNU General Public License as published by
the Free Software Foundation; either version 3, or (at your option)
any later version.

GCC is distributed in the hope that it will be useful,
but WITHOUT ANY WARRANTY; without even the implied warranty of
MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
GNU General Public License for more details.

You should have received a copy of the GNU General Public License
along with GCC; see the file COPYING3.  If not see
<http://www.gnu.org/licenses/>.  */

CC_MODE (CC_Z);      /* only Z valid - for add, testing result.  */
CC_MODE (CC_N_NE);   /* N for not-equal (for lsl).  */
CC_MODE (CC_C_LTU);  /* C for unsigned-less-than (for add with carry).  */
CC_MODE (CC_C_GTU);  /* C for unsigned-greater-than (for sub with carry).  */
CC_MODE (CC_FP);
CC_MODE (CC_FP_EQ);  /* AZ for equal.  */
CC_MODE (CC_FP_ORD); /* AZ || ~AC for ordered.  */
CC_MODE (CC_FP_UNEQ); /* AZ || ~AC for unordered / equal.  */
CC_MODE (CC_FP_GTE); /* ~AC  / AZ for greater than / equal.  */
#if 0 /* This would be needed for simplified NaN testing.  */
RESET_FLOAT_FORMAT (SF, motorola_single_format);
RESET_FLOAT_FORMAT (DF, motorola_double_format);
#endif
VECTOR_MODES (INT, 4);		/* V4QI V2HI */
VECTOR_MODES (INT, 8);		/* V8QI V4HI V2SI */
VECTOR_MODE (FLOAT, SF, 2);	/* V2SF */
ADJUST_ALIGNMENT (V8QI, epiphany_vect_align);
ADJUST_ALIGNMENT (V4HI, epiphany_vect_align);
ADJUST_ALIGNMENT (V2SI, epiphany_vect_align);
ADJUST_ALIGNMENT (V2SF, epiphany_vect_align);
