From 8de916aa9440d506f8ba37dc0bf39dbe98a0f215 Mon Sep 17 00:00:00 2001
From: Thomas Schwinge <thomas@codesourcery.com>
Date: Thu, 9 May 2019 11:52:10 +0200
Subject: Clean up MPX-related stuff: CIF_CHKP

..., which was forgotten in recent r268844.

	gcc/
	* cif-code.def (CHKP): Remove.

From-SVN: r271029
---
 gcc/cif-code.def | 4 ----
 1 file changed, 4 deletions(-)

(limited to 'gcc/cif-code.def')

diff --git a/gcc/cif-code.def b/gcc/cif-code.def
index 0fabfeb..cee16cf 100644
--- a/gcc/cif-code.def
+++ b/gcc/cif-code.def
@@ -141,7 +141,3 @@ DEFCIFCODE(EXTERN_LIVE_ONLY_STATIC, CIF_FINAL_ERROR,
 /* We proved that the call is unreachable.  */
 DEFCIFCODE(UNREACHABLE, CIF_FINAL_ERROR,
 	   N_("unreachable"))
-
-/* We can't inline because of instrumentation thunk.  */
-DEFCIFCODE(CHKP, CIF_FINAL_ERROR,
-	   N_("caller is instrumentation thunk"))
-- 
cgit v1.1

