(* m2configure.def exports configuration constants.

Copyright (C) 2022-2023 Free Software Foundation, Inc.
Contributed by Gaius Mulley <gaius.mulley@southwales.ac.uk>.

This file is part of GNU Modula-2.

GNU Modula-2 is free software; you can redistribute it and/or modify
it under the terms of the GNU General Public License as published by
the Free Software Foundation; either version 3, or (at your option)
any later version.

GNU Modula-2 is distributed in the hope that it will be useful, but
WITHOUT ANY WARRANTY; without even the implied warranty of
MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the GNU
General Public License for more details.

You should have received a copy of the GNU General Public License
along with GNU Modula-2; see the file COPYING3.  If not see
<http://www.gnu.org/licenses/>.  *)

DEFINITION MODULE FOR "C" m2configure ;

FROM SYSTEM IMPORT ADDRESS ;
EXPORT QUALIFIED UseUnderscoreForC, FullPathCPP ;


CONST
(*
   UseUnderscoreForC - true if gcc places an underscore in front of global functions.
*)
   UseUnderscoreForC = FALSE ;


(*
   FullPathCPP - return a string to the full path of the C preprocessor cpp.
                 It checks the -B option (if provided) otherwise it uses
                 the STANDARD_LIBEXEC_PREFIX.
*)

PROCEDURE FullPathCPP () : ADDRESS ;


END m2configure.
